Solaris PEXlib Reference Manual PEXMatrixMult (3)

NAME PEXMatrixMult - utility function

SYNTAX void PEXMatrixMult (PEXMatrix matrix1, PEXMatrix matrix2, PEXMatrix matrix_return)

PARAMETERS matrix1 First matrix to be multiplied.

matrix2 Second matrix to be multiplied.

matrix_return Matrix into which result is stored.

RETURNS None

DESCRIPTION Performs a matrix multiplication: matrix = matrix1 Xmatrix2

If the return matrix is the same as one of the input matrices, the function will overwrite the input values with the multiplied values.

ERRORS None

SEE ALSO PEXMatrixMult2D (3) modified November 1995 241