PEXNormalizeVectors (3) Solaris PEXlib Reference Manual

NAME PEXNormalizeVectors - utility function

SYNTAX int PEXNormalizeVectors (int count, PEXVector ∗vectors, PEXVector ∗vectors_return)

PARAMETERS count The number of vectors to normalize.

vectors A pointer to the array of vectors to normalize.

vectors_return A pointer to an array in which to store the normalized vectors.

RETURNS Zero if successful; otherwise, one of the following:

PEXBadVector

One of the vectors has zero magnitude.

DESCRIPTION This function normalizes each vector in the specified list of 3D vectors. An error is returned if any vector in the list has a magnitude of zero. All non-zero vectors in the list are still normalized, however.

If the return array is the same as the input array, the function will overwrite the input values with the normalized values.

ERRORS None

SEE ALSO PEXTransformVectors (3)

PEXNormalizeVectors2D (3)

252 modified November 1995