Solaris PEXlib Reference Manual PEXQueryFont (3)

NAME PEXQueryFont - Query PEX Font Information

SYNTAX PEXFontInfo ∗PEXQueryFont (Display ∗display, PEXFont font)

PARAMETERS display A pointer to a display structure returned by a successful XOpenDisplay call.

font The resource identifier of the font.

RETURNS A pointer to the font info structure; a null pointer if unsuccessful.

DESCRIPTION This function returns information about the specified PEX font. The information returned is identical to what PEXListFontsWithInfo (3) would return.

PEXlib allocates memory for the returned list of font information. PEXFreeFontInfo (3) should be called to deallocate the memory.

DATA

STRUCTURES typedef XID PEXFont;

typedef struct { unsigned long first_glyph;

unsigned long last_glyph;

unsigned long default_glyph;

Bool all_exist;

Bool stroke;

unsigned short count; / ∗ number of properties ∗/

PEXFontProp ∗props;

}PEXFontInfo;

typedef struct {

Atom name;

unsigned long value;

}PEXFontProp;

ERRORS BadPEXFont

The specified font resource identifier is invalid.

modified November 1995 273