PEXRotate2D (3) Solaris PEXlib Reference Manual

NAME PEXRotate2D - utility function

SYNTAX void PEXRotate2D (double angle, PEXMatrix3x3 matrix_return)

PARAMETERS angle Angle of the rotation in radians.

matrix_return Matrix into which rotation matrix is stored.

RETURNS None

DESCRIPTION The resulting matrix rotates by the angle specified in radians about the origin.

ERRORS None

SEE ALSO PEXRotate (3)

PEXRotateGeneral (3)

284 modified November 1995