Solaris PEXlib Reference Manual PEXSetLineWidth (3)

NAME PEXSetLineWidth - Set Line Width

SYNTAX void PEXSetLineWidth (Display ∗display, XID resource_id, PEXOCRequestType req_type, double width)

PARAMETERS display A pointer to a display structure returned by a successful XOpenDisplay call.

resource_id The resource identifier of the renderer or structure.

req_type The request type for the output command ( PEXOCRender, PEXOC-

Store, PEXOCRenderSingle or PEXOCStoreSingle ).

width The line width scale factor.

RETURNS None

DESCRIPTION This function creates an output primitive attribute which sets the line width attribute. The specified width is used as a scale factor. This scale factor is used to increase or decrease the width (in pixels) from the nominal line width for the display device. The result is mapped to the nearest supported line width.

ERRORS BadPEXRenderer

The specified renderer resource identifier is invalid.

BadPEXStructure

The specified structure resource identifier is invalid.

SEE ALSO PEXGetImpDepConstants (3)

PEXSetIndividualASF (3) modified November 1995 329