Solaris PEXlib Reference Manual PEXSetParaSurfCharacteristics (3)

NAME PEXSetParaSurfCharacteristics - Set Parametric Surface Characteristics

SYNTAX void PEXSetParaSurfCharacteristics (Display ∗display, XID resource_id, PEXOCRequest-

Type req_type, int psc_type, PEXPSCData ∗characteristics )

PARAMETERS display A pointer to a display structure returned by a successful XOpenDisplay call.

resource_id The resource identifier of the renderer or structure.

req_type The request type for the output command ( PEXOCRender, PEXOC-

Store, PEXOCRenderSingle or PEXOCStoreSingle ).

psc_type The parametric surface characteristic type ( PEXPSCNone, PEXPSCImp-

Dep, PEXPSCIsoCurves, PEXPSCMCLevelCurves, PEXPSCWCLevel-

Curves ).

characteristics A pointer to data defining the parametric surface characteristics.

RETURNS None

DESCRIPTION This function creates an output primitive attribute which sets the parametric surface characteristics. If the specified parametric surface characteristics type is not supported,

PEXPSCNone is used. Supported values for parameteric surface characteristic types are inquirable via PEXGetEnumTypeInfo (3).

DATA

STRUCTURES typedef union {

PEXPSCIsoparametricCurves iso_curves;

PEXPSCLevelCurves level_curves;

PEXPSCImpDepData imp_dep;

}PEXPSCData;

typedef struct { unsigned short placement_type;

unsigned short reserved;

unsigned short u_count;

unsigned short v_count;

}PEXPSCIsoparametricCurves;

typedef struct {

PEXCoord origin;

PEXVector direction;

unsigned short count; / ∗ number of parameters ∗/ unsigned short reserved;

float ∗parameters;

}PEXPSCLevelCurves;

typedef struct {

PEXSetParaSurfCharacteristics (3) Solaris PEXlib Reference Manual unsigned short length;

char ∗data;

}PEXPSCImpDepData;

See also PEXlib.h.

ERRORS BadPEXOutputCommand

The output command contains an invalid value.

BadPEXRenderer

The specified renderer resource identifier is invalid.

BadPEXStructure

The specified structure resource identifier is invalid.