PEXSetWorkstationHLHSRMode (3) Solaris PEXlib Reference Manual

NAME PEXSetWorkstationHLHSRMode - Set Workstation HLHSR Mode

SYNTAX void PEXSetWorkstationHLHSRMode (Display ∗display, PEXWorkstation workstation, int hlhsr_mode)

PARAMETERS display A pointer to a display structure returned by a successful XOpenDisplay call.

workstation The resource identifier of the workstation.

hlhsr_mode The workstation HLHSR mode ( PEXHLHSROff, PEXHLHSRZBuffer,

PEXHLHSRPainters, PEXHLHSRScanline, PEXHLHSRHidden-

LineOnly, PEXHLHSRZBufferID ).

RETURNS None

DESCRIPTION This function sets the requested HLHSR mode of the specified workstation. If the workstation’s display surface attribute is PEXEmpty, or if the dynamic modification for

HLHSR mode is PEXIMM, the current HLHSR mode is set to the specified HLHSR mode and the HLHSR update is set to PEXNotPending; otherwise, the HLHSR update is set to

PEXPending and the current HLHSR mode is not changed.

DATA

STRUCTURES typedef XID PEXWorkstation;

ERRORS BadAlloc

The server failed to allocate resources needed for HLHSR.

BadPEXWorkstation

The specified workstation resource identifier is invalid.

BadValue

The specified HLHSR mode is invalid.

382 modified November 1995