PEXSetWorkstationViewRep (3) Solaris PEXlib Reference Manual

NAME PEXSetWorkstationViewRep - Set Workstation View Representation

SYNTAX void PEXSetWorkstationViewRep (Display ∗display, PEXWorkstation workstation, unsigned int view_index, PEXViewEntry ∗values)

PARAMETERS display A pointer to a display structure returned by a successful XOpenDisplay call.

workstation The resource identifier of the workstation.

view_index The view index.

values A pointer to the view representation values.

RETURNS None

DESCRIPTION This function sets the specified view table entry of the requested view table in the specified workstation. If the dynamic modification for the view table is PEXIMM, the current view table entry is set to the specified view representation and the view update is set to PEXNotPending; otherwise, the view update is set to PEXPending and the current view table is not changed.

DATA

STRUCTURES typedef XID PEXWorkstation;

typedef struct { unsigned short clip_flags;

unsigned short reserved;

PEXNPCSubVolume clip_limits;

PEXMatrix orientation;

PEXMatrix mapping;

}PEXViewEntry;

typedef struct {

PEXCoord min;

PEXCoord max;

}PEXNPCSubVolume;

typedef struct { float x;

float y;

float z;

}PEXCoord;

typedef float PEXMatrix[4][4];

Solaris PEXlib Reference Manual PEXSetWorkstationViewRep (3)

ERRORS BadAlloc

The view table is full.

BadPEXWorkstation

The specified workstation resource identifier is invalid.