Solaris PEXlib Reference Manual PEXUnpostStructure (3)

NAME PEXUnpostStructure - Unpost Structure from Workstation

SYNTAX void PEXUnpostStructure (Display ∗display, PEXWorkstation workstation, PEXStructure structure)

PARAMETERS display A pointer to a display structure returned by a successful XOpenDisplay call.

workstation The resource identifier of the workstation.

structure The resource identifier of the structure.

RETURNS None

DESCRIPTION This function removes the specified structure from the workstation’s posted structure list.

If the structure is not found in the list, an error is generated.

DATA

STRUCTURES typedef XID PEXWorkstation;

typedef XID PEXStructure;

ERRORS BadPEXStructure

The specified structure resource identifier is invalid.

BadPEXWorkstation

The specified workstation resource identifier is invalid.

SEE ALSO PEXUnpostAllStructures (3) modified November 1995 405