PEXUpdateWorkstation (3) Solaris PEXlib Reference Manual

NAME PEXUpdateWorkstation - Update Workstation

SYNTAX void PEXUpdateWorkstation (Display ∗display, PEXWorkstation workstation)

PARAMETERS display A pointer to a display structure returned by a successful XOpenDisplay call.

workstation The resource identifier of the workstation.

RETURNS None

DESCRIPTION This function will perform actions identical to PEXRedrawAllStructures (3) on the specified workstation if the workstation’s visual state is currently set to PEXDeferred or

PEXSimulated.

DATA

STRUCTURES typedef XID PEXWorkstation;

ERRORS BadPEXWorkstation

The specified workstation resource identifier is invalid.

SEE ALSO PEXRedrawAllStructures (3)

408 modified November 1995